<template>
  <a-card :bordered="false" style="margin-left: 20px;height: 100%;">
      <div class="detail-top">
        <div class="top-back" @click="handleback">
          <img src="../../assets/images/web-statistics/return.png" alt="">
          <span style="margin-left: 10px;">return</span>
        </div>
        <div class="top-actions">
          <div class="right-btn">
            <img src="../../assets/images/web-statistics/download.png" alt=""><span>ZIP</span>
          </div>
          <div class="right-btn">
            <img src="../../assets/images/web-statistics/download.png" alt=""><span>TXT</span>
          </div>
          <div class="right-btn">
            <img src="../../assets/images/web-statistics/view.png" alt=""><span>View Report</span>
          </div>
        </div>
      </div>
      <a-tabs default-active-key="info" @change="handleTabChange">
        <a-tab-pane key="info" tab="INFO" v-if="allData.headerBlock===null?false:true">
          <templete>
            <div class="pane-title">GENERAL INFORMATION</div>
            <a-row>
              <a-col :span="12">Site Code:</a-col>
              <a-col :span="12">{{ allData.headerBlock.siteCode }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">Detector Code:</a-col>
              <a-col :span="12">{{ allData.headerBlock.detectorCode }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">System Type:</a-col>
              <a-col :span="12">{{ allData.headerBlock.systemType }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">Sample Geometry:</a-col>
              <a-col :span="12">{{ allData.headerBlock.sampleGeometry }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">Spectrum Qualifier:</a-col>
              <a-col :span="12">{{ allData.headerBlock.spectrumQualifier }}P</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">Sample Reference Identification:</a-col>
              <a-col :span="12">{{ allData.headerBlock.sampleReferenceIdentification }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">Measurement Identification:</a-col>
              <a-col :span="12">{{ allData.headerBlock.measurementIdentification }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">Detector Background Measurement Identification:</a-col>
              <a-col :span="12">{{ allData.headerBlock.detectorBackgroundMeasurementId }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">Gas Background Measurement Identification:</a-col>
              <a-col :span="12">{{ allData.headerBlock.gasBackgroundMeasurementId }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">Transmit Time:</a-col>
              <a-col :span="12">{{ allData.headerBlock.transmitDate }}</a-col>
            </a-row>
          </templete>
          <template v-if="allData.commentBlock">
            <div class="pane-title">COMMENT</div>
            <a-row>
              <a-col class="comment-block" :span="24" v-html="commentText"></a-col>
            </a-row>
          </template>
          <template v-if="allData.acquisitionBlock">
            <div class="pane-title">ACQUISITION</div>
            <a-row>
              <a-col :span="12">Acquisition Time:</a-col>
              <a-col :span="12">{{ allData.acquisitionBlock.acquisitionStartDate }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">Acquisition Real Time:</a-col>
              <a-col :span="12">{{ allData.acquisitionBlock.acquisitionRealTime }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12">Acquisition Live Time:</a-col>
              <a-col :span="12">{{ allData.acquisitionBlock.acquisitionLiveTime }}</a-col>
            </a-row>
          </template>
          <template v-if="allData.calibrationBlock">
            <div class="pane-title">CALIBRATION</div>
            <a-row>
              <a-col :span="12">Date of Last Calibration</a-col>
              <a-col :span="12">{{ allData.calibrationBlock.dateOfLastCalibration }}</a-col>
            </a-row>
          </template>
        </a-tab-pane>
        <a-tab-pane key="energy" tab="ENERGY" v-if="allData.gEnergyBlock===null?false:true">
          <div class="pane-title" style="margin-bottom: 15px;">G ENERGY</div>
          <custom-table
            size="middle"
            rowKey="sampleId"
            :columns="columnsEnergy"
            :list="dataSourceEnergy"
            :pagination="false"
          >
          </custom-table>
        </a-tab-pane>
        <a-tab-pane key="resulution" tab="RESOLUTION" v-if="allData.gResolutionBlock===null?false:true">
          <div class="pane-title" style="margin-bottom: 15px;">G RESOLUTION</div>
          <custom-table
            size="middle"
            rowKey="sampleId"
            :columns="columnsResulution"
            :list="dataSourceResulution"
            :pagination="false"
          >
          </custom-table>
        </a-tab-pane>
        <a-tab-pane key="efficiency" tab="EFFICIENCY" v-if="allData.gEfficiencyBlock===null?false:true">
          <div class="pane-title" style="margin-bottom: 15px;">GAMMA EFFICIENCY</div>
          <custom-table
            size="middle"
            rowKey="sampleId"
            :columns="columnsEfficiency"
            :list="dataSourceEfficiency"
            :pagination="false"
          >
          </custom-table>
        </a-tab-pane>
        <a-tab-pane key="gamma-spectrum" tab="GAMMA SPECTRUM" v-if="allData.gSpectrumBlock===null?false:true">
          <div class="pane-title" style="margin-bottom: 15px;">GAMMA SPECTRUM</div>
          <div class="gamma-spectrum-row">
              <div>
                <span>Number of Channels：</span><span class="row-val">8192</span>
                <span style="margin-left: 35px;">Energy Span:</span><span class="row-val">8192</span> 
              </div>
              <div>
                <a-checkbox style="margin-right: 15px;">Y log scale</a-checkbox>
                <a-button class="row-btn">Reset Zoom</a-button>
              </div>
          </div>
          <div class="gamma-spectrum-chart" id="spectrumChartRef"></div>
        </a-tab-pane>
        <a-tab-pane key="certificate" tab="CERTIFICATE" v-if="allData.certificateBlock===null?false:true">
          <div class="pane-title" style="margin-bottom: 15px;">CERTIFICATE</div>
          <div class="certificate-row">
            <span>Total Source Activity [ Bq ]：</span><span class="row-val">8192</span>
            <span style="margin-left: 35px;">Assay Date：</span><span class="row-val">8192</span> 
            <span style="margin-left: 35px;">Units of Activity：</span><span class="row-val">8192</span> 
          </div>
          <custom-table
            size="middle"
            rowKey="sampleId"
            :columns="columnsCertificate"
            :list="dataSourceCertificate"
            :pagination="false"
          >
          </custom-table>
        </a-tab-pane>
      </a-tabs>
    </a-card>
</template>

<script>
import * as echarts from 'echarts'
import allData from "./data.json"
  export default {
    data() {
      return {
        loading:true,
        myChart:null,
        allData,
        tabMenus: [
          {
            name: "INFO",
            key: "info",
            // isShow: this.allData.headerBlock?true:false 
          },{
            name: "ENERGY",
            key: "energy",
            // isShow: this.allData.gEnergyBlock?true:false 
          },{
            name: "RESOLUTION",
            key: "resulution",
            // isShow: this.allData.gResolutionBlock?true:false 
          },{
            name: "EFFICIENCY",
            key: "efficiency",
            // isShow: this.allData.gEfficiencyBlock?true:false 
          },{
            name: "GAMMA SPECTRUM",
            key: "gamma-spectrum",
            // isShow: this.allData.gSpectrumBlock?true:false 
          },{
            name: "CERTIFICATE",
            key:"certificate",
            // isShow: this.allData.certificateBlock?true:false 
          },
        ],
        commentText: "",
        columnsEnergy: [
          {
            title: 'G-Energy [keV]',
            align: 'left',
            dataIndex: 'energy'
          },
          {
            title: 'Centroid channel',
            align: 'left',
            dataIndex: 'centroid'
          },
          {
            title: 'Uncertainty (channels)',
            align: 'left',
            dataIndex: 'uncertainty'
          },
        ],
        dataSourceEnergy:[],
        columnsResulution: [
          {
            title: 'G-Energy [keV]',
            align: 'left',
            dataIndex: 'energy'
          },
          {
            title: 'FWHM [keV]',
            align: 'left',
            dataIndex: 'FWHM'
          },
          {
            title: 'Uncertainty [keV]',
            align: 'left',
            dataIndex: 'uncertainty'
          },
        ],
        dataSourceResulution:[],
        columnsEfficiency: [
          {
            title: 'Energy',
            align: 'left',
            dataIndex: 'energy'
          },
          {
            title: 'Efficiency',
            align: 'left',
            dataIndex: 'efficiency'
          },
          {
            title: 'Uncertainty',
            align: 'left',
            dataIndex: 'uncertainty'
          },
        ],
        dataSourceEfficiency: [],
        columnsCertificate: [
          {
            title: 'Nuclide name',
            align: 'left',
            dataIndex: 'nuclideName'
          },
          {
            title: 'Half-life',
            align: 'left',
            dataIndex: 'halfLife'
          },
          {
            title: 'Activity',
            align: 'left',
            dataIndex: 'nuclideActivity'
          },
          {
            title: 'Uncertainty',
            align: 'left',
            dataIndex: 'uncertainty'
          },
          {
            title: 'Energy',
            align: 'left',
            dataIndex: 'Genergy'
          },
          {
            title: 'Intensity',
            align: 'left',
            dataIndex: 'intensity'
          },
          {
            title: 'Electron decay',
            align: 'left',
            dataIndex: 'electronDecayModeDescriptor'
          },
          {
            title: 'Maximum',
            align: 'left',
            dataIndex: 'maxBParticleEnergy'
          },
          {
            title: 'Particle B intensity',
            align: 'left',
            dataIndex: 'particleBIntensity'
          }
        ],
        dataSourceCertificate:[]
      }
    },
    mounted () {
      console.log(this.allData);
      this.commentText = this.allData.commentBlock.text.replace(/\n/g, "<br />")
      this.dataSourceEnergy=this.allData.gEnergyBlock.gEnergySubBlock
      this.dataSourceResulution=this.allData.gResolutionBlock.gResolutionSubBlock
      this.dataSourceEfficiency = this.allData.gEfficiencyBlock.gEfficiencySubBlock
      this.dataSourceCertificate = this.allData.certificateBlock?this.allData.certificateBlock.certificateSubBlock:[]
    },
  methods: {
    handleback() {
      this.$emit("back",false)
    },
    handleTabChange(key) {
      console.log(key);
      if (key === "gamma-spectrum") {
        this.$nextTick(() => {
          this.drawSpectrumChart()
        })
      } 
    },
    drawSpectrumChart() {
      const spectrumChart = echarts.init(document.getElementById("spectrumChartRef"))
      spectrumChart.setOption({
        tooltip: {
          trigger: 'item',
          formatter: '{a} <br/>{b} : {c}'
        },
        xAxis: {
          type: 'value',
          splitLine: {
            show: true,
            lineStyle: {
              color: "rgbA(64, 105, 121, 0.2)"
            }
          },
          data: ['A', 'B', 'C', 'D', 'E', 'F', 'G', 'H', 'I']
        },
        grid: {
          left: '3%',
          right: '4%',
          bottom: '3%',
          containLabel: true
        },
        yAxis: {
          type: 'log',
          splitLine: {
            show: true,
            lineStyle: {
              color: "rgbA(64, 105, 121, 0.2)"
            }
          }
        },
        series: [
          {
            name: 'Log2',
            type: 'line',
            itemStyle: { normal: { color: '#0656ff' } },
            data: [1, 3, 9, 27, 81, 247, 741, 2223, 6669]
          }
        ]
      })
      window.addEventListener("resize", function () {
        myChart.resize();
      });
    }
    },
  }
</script>

<style lang="less" scoped>
.detail-top{
  width: 100%;
  height: 50px;
  padding: 0 10px;
  background-color: rgba(12, 235, 201, 0.05);
  border-top: 1px solid rgba(12, 235, 201, 0.3);
  border-bottom: 1px solid rgba(12, 235, 201, 0.3);
  display: flex;
  align-items: center;
  justify-content: space-between;
  margin-bottom: 16px;
  .top-back{
    font-family: MicrosoftYaHei;
    font-size: 16px;
    font-weight: normal;
    font-stretch: normal;
    letter-spacing: 0px;
    color: #69a19f;
  }
  .top-actions{
    .right-btn{
      display: inline-block;
      height: 32px;
      line-height: 32px;
      padding: 0 12px;
      margin-left: 20px;
	    background-color: #1397a3;
    }
  }
}
::v-deep {
  .ant-tabs{
    height: calc(100% - 66px);
    .ant-tabs-top-content{
      height: calc(100% - 56px);
      .ant-tabs-tabpane{
        height: 100%;
        overflow: auto;
      }
    }
  }
  .ant-tabs-bar{
    width: 100%;
    height: 40px;
    padding: 0 10px;
    background-color: rgba(12, 235, 201, 0.05);
    border-top: 1px solid rgba(12, 235, 201, 0.3);
    border-bottom: 1px solid rgba(12, 235, 201, 0.3);
  }
  .ant-tabs-nav .ant-tabs-tab{
    height: 30px;
    line-height: 30px;
    background-color: rgba(58, 236, 240, 0.22);
    font-family: BookmanOldStyle;
    font-size: 16px;
    font-weight: bold;
    font-stretch: normal;
    letter-spacing: 2px;
    color: #c9f6f6;
    margin: 0 0 0 10px;
    padding: 0 23px;
    position: relative;
    &::before{
      content: "";
      position: absolute;
      top: 0;
      left: 0;
      width: 7px;
      height: 29px;
      color: rgba(58, 236, 240, 0.22);
      border: 1px solid #569e9e;
      border-right: none;
      border-radius: 0;
    }
    &::after{
      content: "";
      position: absolute;
      top: 0;
      right: 0;
      width: 7px;
      height: 29px;
      color: rgba(58, 236, 240, 0.22);
      border: 1px solid #569e9e;
      border-left: none;
    }
    &-active{
      &::before,
          &::after {
            border-color: #0cecca !important;
          }
    }
  }
  .ant-tabs-ink-bar{
    display: none !important
  }
  .ant-tabs-nav .ant-tabs-tab-active{
    color: #2affdf;
  }
  .ant-tabs-tabpane{
    width: 100%;
    height: calc(100% - 122px);
    border: solid 1px #416f7f;
    padding: 15px 20px;
  }
  .ant-tabs .ant-tabs-top-content > .ant-tabs-tabpane-inactive{
    padding: 15px 20px !important
  }
  .ant-row{
    height: 36px;
    line-height: 36px;
  }
}
.pane-title{
  height: 40px;
  background-color: rgba(12, 235, 201, 0.05);
  line-height: 40px;
  font-family: ArialMT;
  font-size: 18px;
  font-weight: bold;
  font-stretch: normal;
  letter-spacing: 1px;
  color: #0cebc9;
  padding: 0 0 0 18px;
}
.comment-block{
  background-color: rgba(12, 235, 201, 0.05);
  margin-top: 10px;
  padding: 20px;
  line-height: 24px;
}
.gamma-spectrum-row{
  display: flex;
  align-items: center;
  justify-content: space-between;
  .row-val{
    font-family: MicrosoftYaHei;
	  color: #ade6ee;
  }
  .row-btn{
    height: 26px;
	  background-color: #406979;
    line-height: 26px;
    border: none;
  }
}
.gamma-spectrum-chart{
  width: 100%;
  height: calc(100% - 81px);
}
.certificate-row{
  height: 30px;
  display: flex;
  align-items: center;
  font-family: MicrosoftYaHei;
	color: #ade6ee;
  margin-bottom: 10px;
}
</style>